\begin{thebibliography}{1}

\bibitem{codenz}
SNZ 1993.
\newblock {\em Code of practice for timber design}.

\bibitem{eurocode}
EC5 2004.~Eurocode 5.
\newblock {\em Design of timber structures. EN 1995-1-1:2004: Common rules and
  rules for buildings}.

\bibitem{janssens}
M~Janssens.
\newblock {\em Modelling of the thermal degradation of structural wood members
  exposed to fire}.
\newblock Proc. 2nd International Workshop on Structures in Fire, Christchurch,
  New Zealand, 2002.

\bibitem{johansen}
K.W. Johansen.
\newblock {\em Theory of timber connections, International Association of
  Bridge and Structural Engineering, publication No 9:249-262}.
\newblock 1949.

\bibitem{laplanche}
Patrick~Racher Karine~Laplanche, Dhionis~Dhima.
\newblock {\em Predicting the behaviour of dowelled connections in fire: Fire
  tests results and heat transfer modelling}.

\bibitem{lau}
Puong~Hock Lau.
\newblock {\em Fire resistance of connections in laminated veneer timber}.
\newblock 2006.

\bibitem{terence}
Chuo Terence Chung~Biau.
\newblock {\em Fire performance of connections in laminated veneer timber}.
\newblock 2007.

\end{thebibliography}
